HIGH MID LOW

BIOMASS

TOTAL

PRODUCTION

BELOWGROUND

STANDING STOCK

ABOVEGROUND

PO_4

NH_4 pH

SALINITY

25

30

35

ppt

6.0 6.2 6.4 6.6 6.8 7.0

pHM

10 20 30 40 50 60 +

3-

M

0 20 40 60 80 100

0 5 10 15 20 25 30 35

103

2H S

0 10 20 30 40 50

gm-2102gm-2102gm-2101

0 2 4 6 8 10

4 5 6 7 8 9 10